1948 1958 1968 1978 1988 1998 2007 17 17.5 18 18.5 19 Annual Mean Global SST

Year

SST(Deg C)

1948 1958 1968 1978 1988 1998 2007

34.4

34.5

34.6

34.7

34.8

Annual Mean Global SSS

Year

SSS(Psu)

1948 1958 1968 1978 1988 1998 2007 0

5

10

15 Arctic Sea Ice Area

Year

Units:10 6km2

1948 1958 1968 1978 1988 1998 2007 0

5

10

15 Antarctic Sea Ice Area

Year